A 1e6 +RTS -i0.001 -hc -p -K100M 1,751,755,873 bytes x seconds Thu Aug 21 22:43 2008

seconds

0.0 5.0 10.0 15.0 20.0 25.0 bytes

0M

20M

40M

60M

(160)CAF:sum

(129)GHC.Float.CAF